%
% This file is part of the GROMACS molecular simulation package.
%
% Copyright (c) 2013,2014, by the GROMACS development team, led by
% Mark Abraham, David van der Spoel, Berk Hess, and Erik Lindahl,
% and including many others, as listed in the AUTHORS file in the
% top-level source directory and at http://www.gromacs.org.
%
% GROMACS is free software; you can redistribute it and/or
% modify it under the terms of the GNU Lesser General Public License
% as published by the Free Software Foundation; either version 2.1
% of the License, or (at your option) any later version.
%
% GROMACS is distributed in the hope that it will be useful,
% but WITHOUT ANY WARRANTY; without even the implied warranty of
% MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the GNU
% Lesser General Public License for more details.
%
% You should have received a copy of the GNU Lesser General Public
% License along with GROMACS; if not, see
% http://www.gnu.org/licenses, or write to the Free Software Foundation,
% Inc., 51 Franklin Street, Fifth Floor, Boston, MA  02110-1301  USA.
%
% If you want to redistribute modifications to GROMACS, please
% consider that scientific software is very special. Version
% control is crucial - bugs must be traceable. We will be happy to
% consider code for inclusion in the official distribution, but
% derived work must not be called official GROMACS. Details are found
% in the README & COPYING files - if they are missing, get the
% official version at http://www.gromacs.org.
%
% To help us fund GROMACS development, we humbly ask that you cite
% the research papers on the package. Check out http://www.gromacs.org.

\chapter{Technical Details}

\section{Mixed or Double precision}
{\gromacs} can be compiled in either mixed\index{mixed
precision|see{precision, mixed}}\index{precision, mixed} or
\pawsindex{double}{precision}. Documentation of previous {\gromacs}
versions referred to ``single precision'', but the implementation
has made selective use of double precision for many years.
Using single precision
for all variables would lead to a significant reduction in accuracy.
Although in ``mixed precision'' all state vectors, i.e. particle coordinates,
velocities and forces, are stored in single precision, critical variables
are double precision. A typical example of the latter is the virial,
which is a sum over all forces in the system, which have varying signs.
In addition, in many parts of the code we managed to avoid double precision
for arithmetic, by paying attention to summation order or reorganization
of mathematical expressions. The default configuration uses mixed precision,
but it is easy to turn on double precision by adding the option
{\tt -DGMX_DOUBLE=on} to {\tt cmake}. Double precision
will be 20 to 100\% slower than mixed precision depending on the
architecture you are running on. Double precision will use somewhat
more memory and run input, energy and full-precision trajectory files
will be almost twice as large.

The energies in mixed precision are accurate up to the last decimal,
the last one or two decimals of the forces are non-significant.
The virial is less accurate than the forces, since the virial is only one
order of magnitude larger than the size of each element in the sum over
all atoms (\secref{virial}).
In most cases this is not really a problem, since the fluctuations in the
virial can be two orders of magnitude larger than the average.
Using cut-offs for the Coulomb interactions cause large errors
in the energies, forces, and virial.
Even when using a reaction-field or lattice sum method, the errors
are larger than, or comparable to, the errors due to the partial use of
single precision.
Since MD is chaotic, trajectories with very similar starting conditions will
diverge rapidly, the divergence is faster in mixed precision than in double
precision.

For most simulations, mixed precision is accurate enough.
In some cases double precision is required to get reasonable results:
\begin{itemize}
\item normal mode analysis,
for the conjugate gradient or l-bfgs minimization and the calculation and
diagonalization of the Hessian
\item long-term energy conservation, especially for large systems
\end{itemize}

\section{Environment Variables}
{\gromacs} programs may be influenced by the use of
\normindex{environment variables}.  First of all, the variables set in
the {\tt \normindex{GMXRC}} file are essential for running and
compiling {\gromacs}. Some other useful environment variables are
listed in the following sections. Most environment variables function
by being set in your shell to any non-NULL value. Specific
requirements are described below if other values need to be set. You
should consult the documentation for your shell for instructions on
how to set environment variables in the current shell, or in config
files for future shells. Note that requirements for exporting
environment variables to jobs run under batch control systems vary and
you should consult your local documentation for details.

{\bf Output Control}

\begin{enumerate}

\item   {\tt GMX_CONSTRAINTVIR}: print constraint virial and force virial energy terms.
\item   {\tt GMX_MAXBACKUP}: {\gromacs} automatically backs up old
        copies of files when trying to write a new file of the same
        name, and this variable controls the maximum number of
        backups that will be made, default 99. If set to 0 it fails to
        run if any output file already exists. And if set to -1 it
        overwrites any output file without making a backup.
\item   {\tt GMX_NO_QUOTES}: if this is explicitly set, no cool quotes
        will be printed at the end of a program.
\item   {\tt GMX_SUPPRESS_DUMP}: prevent dumping of step files during
        (for example) blowing up during failure of constraint
        algorithms.
\item   {\tt GMX_TPI_DUMP}: dump all configurations to a {\tt .pdb}
        file that have an interaction energy less than the value set
        in this environment variable.
\item   {\tt GMX_VIEW_XPM}: {\tt GMX_VIEW_XVG}, {\tt
        GMX_VIEW_EPS} and {\tt GMX_VIEW_PDB}, commands used to
        automatically view \@ {\tt .xvg}, {\tt .xpm}, {\tt .eps}
        and {\tt .pdb} file types, respectively; they default to {\tt xv}, {\tt xmgrace},
        {\tt ghostview} and {\tt rasmol}. Set to empty to disable
        automatic viewing of a particular file type. The command will
        be forked off and run in the background at the same priority
        as the {\gromacs} tool (which might not be what you want).
        Be careful not to use a command which blocks the terminal
        ({\eg} {\tt vi}), since multiple instances might be run.
\item   {\tt GMX_VIRIAL_TEMPERATURE}: print virial temperature energy term
\item   {\tt GMX_LOG_BUFFER}: the size of the buffer for file I/O. When set
        to 0, all file I/O will be unbuffered and therefore very slow.
        This can be handy for debugging purposes, because it ensures
        that all files are always totally up-to-date.
\item   {\tt GMX_LOGO_COLOR}: set display color for logo in {\tt \normindex{ngmx}}.
\item   {\tt GMX_PRINT_LONGFORMAT}: use long float format when printing
        decimal values.
\item   {\tt GMX_COMPELDUMP}: Applies for computational electrophysiology setups
        only (see section \ref{sec:compel}). The initial structure gets dumped to 
        {\tt .pdb} file, which allows to check whether multimeric channels have 
        the correct PBC representation. 
\end{enumerate}


{\bf Debugging}

\begin{enumerate}

\item   {\tt GMX_PRINT_DEBUG_LINES}: when set, print debugging info on line numbers.
\item   {\tt GMX_DD_NST_DUMP}: number of steps that elapse between dumping
        the current DD to a PDB file (default 0). This only takes effect
        during domain decomposition, so it should typically be
        0 (never), 1 (every DD phase) or a multiple of {\tt nstlist}.
\item   {\tt GMX_DD_NST_DUMP_GRID}: number of steps that elapse between dumping
        the current DD grid to a PDB file (default 0). This only takes effect
        during domain decomposition, so it should typically be
        0 (never), 1 (every DD phase) or a multiple of {\tt nstlist}.
\item   {\tt GMX_DD_DEBUG}: general debugging trigger for every domain
        decomposition (default 0, meaning off). Currently only checks
        global-local atom index mapping for consistency.
\item   {\tt GMX_DD_NPULSE}: over-ride the number of DD pulses used
        (default 0, meaning no over-ride). Normally 1 or 2.

%\item   There are a number of extra environment variables like these
%        that are used in debugging - check the code!

\end{enumerate}

{\bf Performance and Run Control}

\begin{enumerate}

\item   {\tt GMX_DO_GALACTIC_DYNAMICS}: planetary simulations are made possible (just for fun) by setting
        this environment variable, which allows setting {\tt epsilon_r = -1} in the {\tt .mdp}
        file. Normally, {\tt epsilon_r} must be greater than zero to prevent a fatal error.
        See {\wwwpage} for example input files for a planetary simulation.
\item   {\tt GMX_ALLOW_CPT_MISMATCH}: when set, runs will not exit if the
        ensemble set in the {\tt .tpr} file does not match that of the
        {\tt .cpt} file.
\item   {\tt GMX_CUDA_NB_EWALD_TWINCUT}: force the use of twin-range cutoff kernel even if {\tt rvdw} =
        {\tt rcoulomb} after PP-PME load balancing. The switch to twin-range kernels is automated,
        so this variable should be used only for benchmarking.
\item   {\tt GMX_CUDA_NB_ANA_EWALD}: force the use of analytical Ewald kernels. Should be used only for benchmarking.
\item   {\tt GMX_CUDA_NB_TAB_EWALD}: force the use of tabulated Ewald kernels. Should be used only for benchmarking.
\item   {\tt GMX_CUDA_STREAMSYNC}: force the use of cudaStreamSynchronize on ECC-enabled GPUs, which leads
        to performance loss due to a known CUDA driver bug present in API v5.0 NVIDIA drivers (pre-30x.xx).
        Cannot be set simultaneously with {\tt GMX_NO_CUDA_STREAMSYNC}.
\item   {\tt GMX_CYCLE_ALL}: times all code during runs.  Incompatible with threads.
\item   {\tt GMX_CYCLE_BARRIER}: calls MPI_Barrier before each cycle start/stop call.
\item   {\tt GMX_DD_ORDER_ZYX}: build domain decomposition cells in the order
        (z, y, x) rather than the default (x, y, z).
\item   {\tt GMX_DD_USE_SENDRECV2}: during constraint and vsite communication, use a pair
        of {\tt MPI_SendRecv} calls instead of two simultaneous non-blocking calls
        (default 0, meaning off). Might be faster on some MPI implementations.
\item   {\tt GMX_DLB_BASED_ON_FLOPS}: do domain-decomposition dynamic load balancing based on flop count rather than
        measured time elapsed (default 0, meaning off).
        This makes the load balancing reproducible, which can be useful for debugging purposes.
        A value of 1 uses the flops; a value > 1 adds (value - 1)*5\% of noise to the flops to increase the imbalance and the scaling.
\item   {\tt GMX_DLB_MAX_BOX_SCALING}: maximum percentage box scaling permitted per domain-decomposition
        load-balancing step (default 10)
\item   {\tt GMX_DD_RECORD_LOAD}: record DD load statistics for reporting at end of the run (default 1, meaning on)
\item   {\tt GMX_DD_NST_SORT_CHARGE_GROUPS}: number of steps that elapse between re-sorting of the charge
        groups (default 1). This only takes effect during domain decomposition, so should typically
        be 0 (never), 1 (to mean at every domain decomposition), or a multiple of {\tt nstlist}.
\item   {\tt GMX_DETAILED_PERF_STATS}: when set, print slightly more detailed performance information
        to the {\tt .log} file. The resulting output is the way performance summary is reported in versions
        4.5.x and thus may be useful for anyone using scripts to parse {\tt .log} files or standard output.
\item   {\tt GMX_DISABLE_SIMD_KERNELS}: disables architecture-specific SIMD-optimized (SSE2, SSE4.1, AVX, etc.)
        non-bonded kernels thus forcing the use of plain C kernels.
\item   {\tt GMX_DISABLE_CUDA_TIMING}: timing of asynchronously executed GPU operations can have a
        non-negligible overhead with short step times. Disabling timing can improve performance in these cases.
\item   {\tt GMX_DISABLE_GPU_DETECTION}: when set, disables GPU detection even if {\tt \normindex{mdrun}} was compiled
        with GPU support.
\item   {\tt GMX_DISABLE_PINHT}: disable pinning of consecutive threads to physical cores when using
        Intel hyperthreading. Controlled with {\tt \normindex{mdrun} -nopinht} and thus this environment
        variable will likely be removed.
\item   {\tt GMX_DISRE_ENSEMBLE_SIZE}: the number of systems for distance restraint ensemble
        averaging. Takes an integer value.
\item   {\tt GMX_EMULATE_GPU}: emulate GPU runs by using algorithmically equivalent CPU reference code instead of
        GPU-accelerated functions. As the CPU code is slow, it is intended to be used only for debugging purposes.
        The behavior is automatically triggered if non-bonded calculations are turned off using {\tt GMX_NO_NONBONDED}
        case in which the non-bonded calculations will not be called, but the CPU-GPU transfer will also be skipped.
\item   {\tt GMX_ENX_NO_FATAL}: disable exiting upon encountering a corrupted frame in an {\tt .edr}
        file, allowing the use of all frames up until the corruption.
\item   {\tt GMX_FORCE_UPDATE}: update forces when invoking {\tt \normindex{mdrun} -rerun}.
\item   {\tt GMX_GPU_ID}: set in the same way as the {\tt \normindex{mdrun}} option {\tt -gpu_id}, {\tt GMX_GPU_ID}
        allows the user to specify different GPU id-s, which can be useful for selecting different
        devices on different compute nodes in a cluster.  Cannot be used in conjunction with {\tt -gpu_id}.
\item   {\tt GMX_IGNORE_FSYNC_FAILURE_ENV}: allow {\tt \normindex{mdrun}} to continue even if
        a file is missing.
\item   {\tt GMX_LJCOMB_TOL}: when set to a floating-point value, overrides the default tolerance of
        1e-5 for force-field floating-point parameters.
\item   {\tt GMX_MAX_MPI_THREADS}: sets the maximum number of MPI-threads that {\tt \normindex{mdrun}}
        can use.
\item   {\tt GMX_MAXCONSTRWARN}: if set to -1, {\tt \normindex{mdrun}} will
        not exit if it produces too many LINCS warnings.
\item   {\tt GMX_NB_GENERIC}: use the generic C kernel.  Should be set if using
        the group-based cutoff scheme and also sets {\tt GMX_NO_SOLV_OPT} to be true,
        thus disabling solvent optimizations as well.
\item   {\tt GMX_NB_MIN_CI}: neighbor list balancing parameter used when running on GPU. Sets the
        target minimum number pair-lists in order to improve multi-processor load-balance for better
        performance with small simulation systems. Must be set to a positive integer, the default value
        is optimized for NVIDIA Fermi and Kepler GPUs, therefore changing it is not necessary for
        normal usage, but it can be useful on future architectures.
\item   {\tt GMX_NBLISTCG}: use neighbor list and kernels based on charge groups.
\item   {\tt GMX_NBNXN_CYCLE}: when set, print detailed neighbor search cycle counting.
\item   {\tt GMX_NBNXN_EWALD_ANALYTICAL}: force the use of analytical Ewald non-bonded kernels,
        mutually exclusive of {\tt GMX_NBNXN_EWALD_TABLE}.
\item   {\tt GMX_NBNXN_EWALD_TABLE}: force the use of tabulated Ewald non-bonded kernels,
        mutually exclusive of {\tt GMX_NBNXN_EWALD_ANALYTICAL}.
\item   {\tt GMX_NBNXN_SIMD_2XNN}: force the use of 2x(N+N) SIMD CPU non-bonded kernels,
        mutually exclusive of {\tt GMX_NBNXN_SIMD_4XN}.
\item   {\tt GMX_NBNXN_SIMD_4XN}: force the use of 4xN SIMD CPU non-bonded kernels,
        mutually exclusive of {\tt GMX_NBNXN_SIMD_2XNN}.
\item   {\tt GMX_NO_ALLVSALL}: disables optimized all-vs-all kernels.
\item   {\tt GMX_NO_CART_REORDER}: used in initializing domain decomposition communicators. Rank reordering
        is default, but can be switched off with this environment variable.
\item   {\tt GMX_NO_CUDA_STREAMSYNC}: the opposite of {\tt GMX_CUDA_STREAMSYNC}. Disables the use of the
        standard cudaStreamSynchronize-based GPU waiting to improve performance when using CUDA driver API
        ealier than v5.0 with ECC-enabled GPUs.
\item   {\tt GMX_NO_INT}, {\tt GMX_NO_TERM}, {\tt GMX_NO_USR1}: disable signal handlers for SIGINT,
        SIGTERM, and SIGUSR1, respectively.
\item   {\tt GMX_NO_NODECOMM}: do not use separate inter- and intra-node communicators.
\item   {\tt GMX_NO_NONBONDED}: skip non-bonded calculations; can be used to estimate the possible
        performance gain from adding a GPU accelerator to the current hardware setup -- assuming that this is
        fast enough to complete the non-bonded calculations while the CPU does bonded force and PME computation.
\item   {\tt GMX_NO_PULLVIR}: when set, do not add virial contribution to COM pull forces.
\item   {\tt GMX_NOCHARGEGROUPS}: disables multi-atom charge groups, {\ie} each atom 
        in all non-solvent molecules is assigned its own charge group.
\item   {\tt GMX_NOPREDICT}: shell positions are not predicted.
\item   {\tt GMX_NO_SOLV_OPT}: turns off solvent optimizations; automatic if {\tt GMX_NB_GENERIC}
        is enabled.
\item   {\tt GMX_NSCELL_NCG}: the ideal number of charge groups per neighbor searching grid cell is hard-coded
        to a value of 10. Setting this environment variable to any other integer value overrides this hard-coded
        value.
\item   {\tt GMX_PME_NTHREADS}: set the number of OpenMP or PME threads (overrides the number guessed by 
        {\tt \normindex{mdrun}}.
\item   {\tt GMX_PME_P3M}: use P3M-optimized influence function instead of smooth PME B-spline interpolation.
\item   {\tt GMX_PME_THREAD_DIVISION}: PME thread division in the format ``x y z'' for all three dimensions. The
        sum of the threads in each dimension must equal the total number of PME threads (set in 
        {\tt GMX_PME_NTHREADS}).
\item   {\tt GMX_PMEONEDD}: if the number of domain decomposition cells is set to 1 for both x and y, 
        decompose PME in one dimension.
\item   {\tt GMX_REQUIRE_SHELL_INIT}: require that shell positions are initiated.
\item   {\tt GMX_REQUIRE_TABLES}: require the use of tabulated Coulombic
        and van der Waals interactions.
\item   {\tt GMX_SCSIGMA_MIN}: the minimum value for soft-core $\sigma$. {\bf Note} that this value is set
        using the {\tt sc-sigma} keyword in the {\tt .mdp} file, but this environment variable can be used
        to reproduce pre-4.5 behavior with respect to this parameter.
\item   {\tt GMX_TPIC_MASSES}: should contain multiple masses used for test particle insertion into a cavity.
        The center of mass of the last atoms is used for insertion into the cavity.
\item   {\tt GMX_USE_GRAPH}: use graph for bonded interactions.
\item   {\tt GMX_VERLET_BUFFER_RES}: resolution of buffer size in Verlet cutoff scheme.  The default value is
        0.001, but can be overridden with this environment variable.
\item   {\tt GMX_VERLET_SCHEME}: convert from group-based to Verlet cutoff scheme, even if the {\tt cutoff_scheme} is
        not set to use Verlet in the {\tt .mdp} file. It is unnecessary since the {\tt -testverlet} option of
        {\tt \normindex{mdrun}} has the same functionality, but it is maintained for backwards compatibility.
\item   {\tt MPIRUN}: the {\tt mpirun} command used by {\tt \normindex{g_tune_pme}}.
\item   {\tt MDRUN}: the {\tt \normindex{mdrun}} command used by {\tt \normindex{g_tune_pme}}.
\item   {\tt GMX_NSTLIST}: sets the default value for {\tt nstlist}, preventing it from being tuned during
        {\tt \normindex{mdrun}} startup when using the Verlet cutoff scheme.
\item   {\tt GMX_USE_TREEREDUCE}: use tree reduction for nbnxn force reduction. Potentially faster for large number of 
        OpenMP threads (if memory locality is important).

\end{enumerate}

{\bf Analysis and Core Functions}

\begin{enumerate}

\item   {\tt GMX_QM_ACCURACY}: accuracy in Gaussian L510 (MC-SCF) component program.
\item   {\tt GMX_QM_ORCA_BASENAME}: prefix of {\tt .tpr} files, used in Orca calculations
        for input and output file names.
\item   {\tt GMX_QM_CPMCSCF}: when set to a nonzero value, Gaussian QM calculations will
        iteratively solve the CP-MCSCF equations.
\item   {\tt GMX_QM_MODIFIED_LINKS_DIR}: location of modified links in Gaussian.
\item   {\tt DSSP}: used by {\tt \normindex{do_dssp}} to point to the {\tt dssp}
        executable (not just its path).
\item   {\tt GMX_QM_GAUSS_DIR}: directory where Gaussian is installed.
\item   {\tt GMX_QM_GAUSS_EXE}: name of the Gaussian executable.
\item   {\tt GMX_DIPOLE_SPACING}: spacing used by {\tt \normindex{g_dipoles}}.
\item   {\tt GMX_MAXRESRENUM}: sets the maximum number of residues to be renumbered by
        {\tt \normindex{grompp}}. A value of -1 indicates all residues should be renumbered.
\item   {\tt GMX_FFRTP_TER_RENAME}: Some force fields (like AMBER) use specific names for N- and C-
        terminal residues (NXXX and CXXX) as {\tt .rtp} entries that are normally renamed. Setting
        this environment variable disables this renaming.
\item   {\tt GMX_PATH_GZIP}: {\tt gunzip} executable, used by {\tt \normindex{g_wham}}.
\item   {\tt GMX_FONT}: name of X11 font used by {\tt \normindex{ngmx}}.
\item   {\tt GMXTIMEUNIT}: the time unit used in output files, can be
        anything in fs, ps, ns, us, ms, s, m or h.
\item   {\tt GMX_QM_GAUSSIAN_MEMORY}: memory used for Gaussian QM calculation.
\item   {\tt MULTIPROT}: name of the {\tt multiprot} executable, used by the
        contributed program {\tt \normindex{do_multiprot}}.
\item   {\tt NCPUS}: number of CPUs to be used for Gaussian QM calculation
\item   {\tt GMX_ORCA_PATH}: directory where Orca is installed.
\item   {\tt GMX_QM_SA_STEP}: simulated annealing step size for Gaussian QM calculation.
\item   {\tt GMX_QM_GROUND_STATE}: defines state for Gaussian surface hopping calculation.
\item   {\tt GMX_TOTAL}: name of the {\tt total} executable used by the contributed
        {\tt \normindex{do_shift}} program.
\item   {\tt GMX_ENER_VERBOSE}: make {\tt \normindex{g_energy}} and {\tt \normindex{eneconv}}
        loud and noisy.
\item   {\tt VMD_PLUGIN_PATH}: where to find VMD plug-ins. Needed to be
        able to read file formats recognized only by a VMD plug-in.
\item   {\tt VMDDIR}: base path of VMD installation.
\item   {\tt GMX_USE_XMGR}: sets viewer to {\tt xmgr} (deprecated) instead of {\tt xmgrace}.

\end{enumerate}

\section{Running {\gromacs} in parallel}
By default {\gromacs} will be compiled with the built-in thread-MPI library.
This library handles communication between threads on a single
node more efficiently than using an external MPI library.
To run {\gromacs} in parallel over multiple nodes, e.g. on a cluster,
you need to configure and compile {\gromacs} with an external
MPI library. All supercomputers are shipped with MPI libraries optimized for 
that particular platform, and there are several good free MPI
implementations; OpenMPI is usually a good choice.
Note that MPI and thread-MPI support are mutually incompatible.

In addition to MPI parallelization, {\gromacs} supports also
thread-parallelization through \normindex{OpenMP}. MPI and OpenMP parallelization
can be combined, which results in, so called, hybrid parallelization. It can offer
better performance and scaling in some cases.

See {\wwwpage} for details on the use and performance of the different
parallelization schemes.

\section{Running {\gromacs} on \normindex{GPUs}}
As of version 4.6, {\gromacs} has native GPU support through CUDA.
Note that {\gromacs} only off-loads the most compute intensive parts
to the GPU, currently the non-bonded interactions, and does all other
parts of the MD calculation on the CPU. The requirements for the CUDA code
are an Nvidia GPU with compute capability $\geq 2.0$, i.e. at
least Fermi class.
In many cases {\tt cmake} can auto-detect GPUs and the support will be
configured automatically. To be sure GPU support is configured, pass
the {\tt -DGMX_GPU=on} option to {\tt cmake}. The actual use of GPUs
is decided at run time by {\tt mdrun}, depending on the availability
of (suitable) GPUs and on the run input settings. A binary compiled
with GPU support can also run CPU only simulations. Use {\tt mdrun -nb cpu}
to force a simulation to run on CPUs only. Only simulations with the Verlet
cut-off scheme will run on a GPU. To test performance of old tpr files
with GPUs, you can use the {\tt -testverlet} option of {\tt mdrun},
but as this doesn't do the full parameter consistency check of {\tt grommp},
you should not use this option for production simulations.
Getting good performance with {\gromacs} on GPUs is easy,
but getting best performance can be difficult.
Please check {\wwwpage} for up to date information on GPU usage.

% LocalWords:  Opteron Itanium PowerPC Altivec Athlon Fortran virial bfgs Nasm
% LocalWords:  diagonalization Cygwin MPI Multi GMXHOME extern gmx tx pid buf
% LocalWords:  bufsize txs rx rxs init nprocs fp msg GMXRC DUMPNL BUFS GMXNPRI
% LocalWords:  unbuffered SGI npri mdrun covar nmeig setenv XPM XVG EPS
% LocalWords:  PDB xvg xpm eps pdb xmgrace ghostview rasmol GMXTIMEUNIT fs dssp
% LocalWords:  mpi distclean ing mpirun goofus doofus fred topol np
% LocalWords:  internet gromacs DGMX cmake SIMD intrinsics AVX PME XN
% LocalWords:  Verlet pre config CONSTRAINTVIR MAXBACKUP TPI ngmx mdp
% LocalWords:  LONGFORMAT DISTGCT CPT tpr cpt CUDA EWALD TWINCUT rvdw
% LocalWords:  rcoulomb STREAMSYNC cudaStreamSynchronized ECC GPUs sc
% LocalWords:  ZYX PERF GPU PINHT hyperthreading DISRE NONBONDED ENX
% LocalWords:  edr ENER gpu FSYNC ENV LJCOMB TOL MAXCONSTRWARN LINCS
% LocalWords:  SOLV NBLISTCG NBNXN XNN ALLVSALL cudaStreamSynchronize
% LocalWords:  USR SIGINT SIGTERM SIGUSR NODECOMM intra PULLVIR multi
% LocalWords:  NOCHARGEGROUPS NOPREDICT NSCELL NCG NTHREADS OpenMP CP
% LocalWords:  PMEONEDD Coulombic der Waals SCSIGMA TPIC GMXNPRIALL
% LocalWords:  GOMP KMP pme NSTLIST ENVVAR nstlist startup OMP NUM ps
% LocalWords:  ACC SCF BASENAME Orca CPMCSCF MCSCF DEVEL EXE GKRWIDTH
% LocalWords:  MAXRESRENUM grompp FFRTP TER NXXX CXXX rtp GZIP gunzip
% LocalWords:  GMXFONT ns MEM MULTIPROT multiprot NCPUS CPUs OPENMM
% LocalWords:  PLUGIN OpenMM plugins SASTEP TESTMC eneconv VMD VMDDIR
% LocalWords:  GMX_USE_XMGR xmgr parallelization nt online Nvidia nb cpu
% LocalWords:  testverlet grommp
